* SUSE Linux for IBM z Systems Installation System
boot/s390x/linux 0x00000000
boot/s390x/initrd.off 0x0001040c
boot/s390x/initrd.siz 0x00010414
boot/s390x/initrd 0x01000000
boot/s390x/parmfile 0x00010480
